         180           8
   10.0200394075646        9.31913428432821        8.63425198030658     
   7.94894028396702        7.27322155401401        6.61830464419789     
   5.99718538606411        5.38761480046541     
  -7.30715258214005       -7.43890216330438       -7.50870083184678     
  -7.58175948836839       -7.60414506460805       -7.64232230536729     
  -7.62090562790395       -7.43194345439699     
 -9.304784796798585E-003  0.000000000000000E+000
   1.01010309184735       0.000000000000000E+000
   1.01428143175880       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
