         180           8
   6.08731834793937        5.57874949642763        5.21151583626732     
   4.87954298307728        4.52565252469708        4.21259309120201     
   3.87913860990357        3.76104999327675     
  -7.42196103359124       -7.59863696309162       -7.56136886747126     
  -7.42957791335620       -7.32122027199831       -7.26137973429999     
  -7.20799637593889       -7.23594557867388     
 -8.853916052953884E-003  0.000000000000000E+000
   1.00936295413017       0.000000000000000E+000
   1.01412088731910       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
