         180           8
   5.90405336992985        5.62212806530845        5.36279996111288     
   5.12999302549843        4.92421203114602        4.79904963794047     
   4.57355124413529        4.37740928114738     
  -9.28144708638176       -9.12685312292854       -9.09939422278433     
  -8.98103018367351       -8.91687513709892       -8.94268656842867     
  -8.87655708607738       -8.93103375025141     
 -8.694637062150410E-003  0.000000000000000E+000
   1.00939076252101       0.000000000000000E+000
   1.01412615344074       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
