         180           8
   8.04061667810467        7.62713017730636        7.27002742070267     
   6.93275269350270        6.63201550825722        6.45219251184088     
   6.20095032889770        6.04170591615724     
  -9.29465659871957       -9.40211458389369       -9.49134752994267     
  -9.59348346214991       -9.67131913636102       -9.70861567171786     
  -9.68794507843646       -9.63908145598482     
 -8.662210948373422E-003  0.000000000000000E+000
   1.00963196066768       0.000000000000000E+000
   1.01449810410154       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
