         180           8
  0.646027310962001       0.428572507961927       0.254112513302760     
  8.882495141261142E-002 -7.225477482095831E-002 -0.338932934435907     
 -0.644565968728876      -0.718252760761268     
  -7.61913622954646       -7.76436150654645       -7.87149043788755     
  -7.89931862012687       -7.94292728935873       -8.21839215802126     
  -8.48156143237327       -8.59818786313707     
 -9.104352060097314E-003  0.000000000000000E+000
   1.00981603632062       0.000000000000000E+000
   1.01360835792885       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
