         180           3
   16.0841027672741        13.0566244116138        10.8895306995191     
  -6.41099827215693       -6.45938995429178       -6.80311066303280     
  1.444070782904504E-003  0.000000000000000E+000
  0.987392376394007       0.000000000000000E+000
  0.984578503233819       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
