         180           8
   10.9371729500640        10.1696730594419        9.47477185091231     
   8.77487844288570        8.05923611248510        7.37544072775501     
   6.73965445487935        6.09935172299169     
  -8.25119025083326       -8.17449650725622       -8.20599798558463     
  -8.22776564983820       -8.28247841371422       -8.35813643149600     
  -8.42044139805011       -8.54156104418225     
 -9.145386934959804E-003  0.000000000000000E+000
   1.01045425449214       0.000000000000000E+000
   1.01410509882264       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
