         180           8
   7.02590589665462        6.64985643959217        6.36739733539729     
   6.10743889228835        5.91383692198608        5.77249270968590     
   5.59223620891536        5.46458235314556     
  -9.57503484998847       -9.62140455326493       -9.62786609837273     
  -9.56280738320569       -9.52170149784632       -9.51925932591634     
  -9.50005634641744       -9.48571199715483     
 -8.762193695533375E-003  0.000000000000000E+000
   1.00964198941800       0.000000000000000E+000
   1.01415982649773       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
