         180           8
   9.33261735153205        8.97406184258650        8.58202681939127     
   8.23062269031108        7.90682100079630        7.62921214891060     
   7.37345491727049        7.25919079043997     
  -9.58306334376843       -9.74268852580584       -9.83148385768402     
  -9.95346195936758       -10.0621233184599       -10.1342508028169     
  -10.1030179907097       -10.1611178605617     
 -8.737909511140330E-003  0.000000000000000E+000
   1.00988473424959       0.000000000000000E+000
   1.01444961928072       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
