         180           8
  0.345365210417820       0.130219681203815      -4.898929658642425E-002
 -0.204678435146230      -0.363256181101095      -0.606418231698073     
 -0.825033098386374      -0.914305659635621     
  -6.98797047458454       -7.10403355182336       -7.15475561607683     
  -7.13146486593369       -7.06351866100171       -7.03706985868704     
  -6.98323370672471       -7.00647461606102     
 -9.024032489804561E-003  0.000000000000000E+000
   1.00943743545728       0.000000000000000E+000
   1.01384774558563       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
