         180           8
   3.52232988334134        3.07509302111339        2.76244413429897     
   2.47004793501832        2.20059980141351        1.93921591813198     
   1.71289438786040        1.56568401175898     
  -7.26375517919091       -7.66412126140615       -7.91872576281197     
  -8.09827381074599       -8.16328124422143       -8.20287193293860     
  -8.17222607428578       -8.11475050841428     
 -9.032065571775777E-003  0.000000000000000E+000
   1.00942914013548       0.000000000000000E+000
   1.01401716899062       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
