         180           8
   4.53368111358401        4.31837735630625        4.11774352530193     
   3.95737673586871        3.84755324138779        3.74998145856587     
   3.64036999564039        3.54898245558483     
  -7.53684372978561       -7.36724180602487       -7.12592690141089     
  -6.98520551691121       -6.78157736861223       -6.53286958642262     
  -6.32156646084440       -6.17212222706401     
 -8.951570440489108E-003  0.000000000000000E+000
   1.00961804750490       0.000000000000000E+000
   1.01406900040135       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
