         180           8
  0.711062380590901       0.445701243917318       0.257887027681939     
  0.105161083366056      -5.192587144353521E-002 -0.241935804953296     
 -0.419797108871727      -0.591395411511365     
  -6.29187934534213       -6.53289456861923       -6.61708964038655     
  -6.63271747882339       -6.61969073386477       -6.58708208151489     
  -6.50537293485805       -6.54455027707672     
 -8.928063264285642E-003  0.000000000000000E+000
   1.00918928562699       0.000000000000000E+000
   1.01357481235330       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
