         180           8
   2.87674397501818        2.41886495073266        2.10568484142656     
   1.91936676622293        1.72178462360241        1.44383640329616     
   1.21176609551115        1.10012582878082     
  -6.39612979281292       -6.85345594363351       -7.22770296913907     
  -7.28782040076612       -7.38844295150421       -7.48016344041664     
  -7.36760136786471       -7.26739785382275     
 -8.905511525844786E-003  0.000000000000000E+000
   1.00958336719072       0.000000000000000E+000
   1.01365442725374       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
