         180           3
   9.05102352233765        10.7165076254140        11.9904601577057     
  -8.47637295097075       -7.94141168428721       -6.18166285218096     
  1.682849210284434E-003  0.000000000000000E+000
  0.987181068095028       0.000000000000000E+000
  0.984568536768709       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
