         180           8
 -7.464836380487574E-002 -0.237884258188767      -0.376234104318364     
 -0.548356033403411      -0.713351890087945      -0.972269756825332     
  -1.20841443602730       -1.24494783183101     
  -5.93539905677297       -6.18605259339417       -6.14853606798409     
  -6.14274938538833       -6.11773972817174       -6.04831489941104     
  -6.04492782658430       -6.24427652812687     
 -8.891222619104919E-003  0.000000000000000E+000
   1.00913711151625       0.000000000000000E+000
   1.01361716857021       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
