         180           8
   5.01050988522551        4.72933734268033        4.54324784090622     
   4.38395798109952        4.31242605731165        4.21960228835498     
   4.04576675824813        3.87154110933705     
  -6.47954721031059       -6.34670421234594       -6.25032876960579     
  -6.20504462969364       -5.94844524606437       -5.67488297534000     
  -5.52939184852881       -5.41217537799204     
 -8.740523660480165E-003  0.000000000000000E+000
   1.00920306744810       0.000000000000000E+000
   1.01367358898366       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
