         180           8
   4.37087380151810        4.14986951139367        3.91348192872604     
   3.70388411110740        3.43837303767630        3.24976044938435     
   3.20885972374283        3.33175890309297     
  -6.64604163642240       -6.23616595506757       -5.90297045923570     
  -5.66773563194297       -5.61132061955966       -5.61404742796817     
  -5.54288589784663       -5.27282080098989     
 -8.769470979245462E-003  0.000000000000000E+000
   1.00919321499043       0.000000000000000E+000
   1.01359007264918       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
