         180           8
   12.9470116209172        12.6326980295377        12.3715423832646     
   12.1643832576896        11.9539826917191        11.7512246064466     
   11.6614855471718        11.1131520647228     
  -12.7028725545103       -12.9433030965352       -13.2638071382776     
  -13.6685398563792       -13.9597667066407       -14.1622506576218     
  -14.8208492448825       -14.4444033421756     
 -9.151548039233664E-003  0.000000000000000E+000
   1.01033537126171       0.000000000000000E+000
   1.01510842860253       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
