         180           8
   1.89637296312184        1.48947282412283        1.24188467630811     
   1.04213844305952       0.829788099809914       0.561581511151984     
  0.343964780581503       0.152295747705767     
  -8.09305729842844       -9.32681015571146       -9.98436179141858     
  -10.5624980979221       -10.8225386711970       -10.8452493939053     
  -10.8670299007549       -10.9915227771995     
 -9.568749265969503E-003  0.000000000000000E+000
   1.01004185320149       0.000000000000000E+000
   1.01447094081365       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
