         180           3
   14.2824313034054        11.7301550556320        9.37654225209740     
  -10.9639071467771       -10.7123525774598       -11.0148487473619     
  1.530119989064444E-003  0.000000000000000E+000
  0.987647237656424       0.000000000000000E+000
  0.985151769546245       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
