         180           3
   14.1700005534014        11.4830110389400        9.32568614394313     
  -10.7731230520672       -10.4130120881626       -10.7131072521816     
  1.420942763502923E-003  0.000000000000000E+000
  0.987693898149279       0.000000000000000E+000
  0.985104352849255       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
