         180           8
   12.2030402770315        11.0438355554694        10.4315046628312     
   9.68554272583944        9.01017204713770        8.32620567321877     
   7.60213232592559        7.22404523698587     
  -8.42566527500033       -9.16383650750398       -9.32753461247076     
  -9.48532021093869       -9.60802006956550       -9.71815253017367     
  -9.89576946510873       -10.0281488815978     
 -9.655325996396227E-003  0.000000000000000E+000
   1.01036434272547       0.000000000000000E+000
   1.01475858638433       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
