         180           8
   16.3625975795704        14.9565460108600        14.3481851645659     
   13.5165898125827        12.7517345633765        12.0093112511141     
   11.2447682357622        10.6540340099350     
  -9.48732006293686       -10.1714360441091       -10.2275350580746     
  -10.3501784751705       -10.4345789102671       -10.5031586412442     
  -10.6243643024458       -10.7439167830845     
 -9.530251635124729E-003  0.000000000000000E+000
   1.01059256012233       0.000000000000000E+000
   1.01501725013801       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
