         180           3
   10.4751857289982        11.7738796680817        13.2914208847563     
  -9.81958923562486       -9.31447926816271       -8.05233098345224     
  2.134282535557603E-003  0.000000000000000E+000
  0.987095748625797       0.000000000000000E+000
  0.984472570314309       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
