         180           8
   13.0145783301768        12.2139951871007        11.4468437770023     
   10.7108627439472        10.0228667202553        9.37733659315739     
   8.71941184453681        8.02677193838898     
  -5.20881602087579       -6.10411042836869       -6.53455784895084     
  -6.76986517515862       -6.92077824706520       -7.08842940080185     
  -7.26579028590327       -7.42076500029179     
 -8.842707283291781E-003  0.000000000000000E+000
   1.00988709950361       0.000000000000000E+000
   1.01383400987945       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
