         180           8
   13.0453002255381        12.3903142716178        11.6030261358278     
   10.8868271401388        10.2115903188152        9.52824072815520     
   8.87952568152124        8.21559896244771     
  -8.06110710999324       -8.19329829617269       -8.22762872545465     
  -8.23359153582463       -8.23982650060624       -8.32078610680757     
  -8.41315736976140       -8.49717093694945     
 -8.729786728009380E-003  0.000000000000000E+000
   1.00971513234390       0.000000000000000E+000
   1.01378463508575       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
