         180           8
   13.9094269130987        13.7340827511606        13.5319986599566     
   13.3197248860222        13.1030891023438        12.9402762678005     
   12.7973335442498        12.5551027895043     
  -10.2395500524410       -10.2352302950153       -10.1404945769786     
  -9.99720753305878       -9.83812535576088       -9.71698109434614     
  -9.54356801852641       -9.34374701783261     
 -8.429093054889392E-003  0.000000000000000E+000
   1.00954028777459       0.000000000000000E+000
   1.01389298386681       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
