         180           3
   17.6540055955071        14.9138218788716        13.0014758162207     
  -13.5806010178011       -14.0036661492957       -14.0159952644847     
  1.551846050943856E-003  0.000000000000000E+000
  0.988639641196310       0.000000000000000E+000
  0.986212840350978       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
