         180           8
   14.3776099217230        13.5873302240903        12.9138809474448     
   12.2180039940363        11.5517741922340        10.9036390669552     
   10.2941967575780        9.70160192533745     
  -13.1502049552454       -13.1776436046997       -13.2229514961070     
  -13.2593252717095       -13.3214874624227       -13.3946471264563     
  -13.4189044465498       -13.5157219362264     
 -9.977533747203643E-003  0.000000000000000E+000
   1.01086565207314       0.000000000000000E+000
   1.01542085176079       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
