         180           3
   17.1546102165245        14.3333061378296        12.3910459733252     
  -11.0229803428948       -12.8192765176688       -13.2389780992449     
  1.546763769401287E-003  0.000000000000000E+000
  0.988320058299840       0.000000000000000E+000
  0.985984962588992       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
