         180           8
   14.7277487414448        13.8793330999998        13.1246820193703     
   12.4076766652826        11.6843680418889        10.9834661997034     
   10.3247402504849        9.72996101903634     
  -10.6584555145970       -11.7889508163674       -12.2702378517144     
  -12.5469744316061       -12.7273313164809       -12.8490621816412     
  -12.9956830864291       -13.0951950531419     
 -9.973903458581970E-003  0.000000000000000E+000
   1.01128036242337       0.000000000000000E+000
   1.01529834961354       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
