         180           8
   11.5595132170649        12.0095860756276        12.4295775331709     
   12.8696284394001        13.3081068135570        13.7566889386158     
   14.2060460490780        14.6564972560841     
  -16.5579691114451       -16.3174690487611       -15.9956455689903     
  -15.6675453474124       -15.3533429968948       -15.0651280420599     
  -14.7987310516974       -14.4124498939461     
  1.326293376184022E-003  0.000000000000000E+000
  0.989174051834111       0.000000000000000E+000
  0.987242316907092       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
