         180           8
   10.0595444679339        9.90199170657514        9.71051255971585     
   9.56949490537621        9.42020821351302        9.26633725609202     
   9.16307071712197        9.00914516816482     
  -15.0158453083250       -14.8914405656232       -14.7102447471346     
  -14.5094163531676       -14.2792622984552       -14.0817804706594     
  -13.8818210954058       -13.6462176375393     
 -9.824685952710370E-003  0.000000000000000E+000
   1.01103580615248       0.000000000000000E+000
   1.01558729924329       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
