         180           3
   12.3049952664045        13.7003029642990        15.1362756311549     
  -17.3463520551581       -16.5687398556555       -15.3996773183179     
  1.583152099663697E-003  0.000000000000000E+000
  0.989192383549175       0.000000000000000E+000
  0.987533511205238       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
