         180           8
   12.2916065551683        12.0170139870889        11.8028246397370     
   11.5972721953417        11.4549758940065        11.2773946030278     
   11.1223011510728        10.9529149543901     
  -15.3809751418406       -15.1613545966355       -14.9928125537398     
  -14.8175715386407       -14.6525283118985       -14.4330378739379     
  -14.2069526976843       -13.9212255582549     
 -9.754294535130680E-003  0.000000000000000E+000
   1.01097132225502       0.000000000000000E+000
   1.01558722865463       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
