         180           3
   11.9517493259616        13.3501527980560        14.9170045675670     
  -17.0682551495695       -16.0151333449656       -14.9874888010492     
  1.483561802362289E-003  0.000000000000000E+000
  0.989160741697594       0.000000000000000E+000
  0.987482766919189       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
