         180           8
   11.0012923449574        10.7916311214323        10.6102666686357     
   10.4251371979230        10.2401487369485        10.0857611263740     
   9.93654612600777        9.86199460228620     
  -15.2712123941737       -15.0319909818816       -14.8121438258920     
  -14.6282020952688       -14.4532017479546       -14.2559785333635     
  -14.0415593325856       -13.7440883374534     
 -9.800445994265959E-003  0.000000000000000E+000
   1.01092189163450       0.000000000000000E+000
   1.01543873295493       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
