         180           3
   19.0048512630610        15.6352592072004        13.7169327819189     
 -0.988601146575581       -5.52076264487117       -5.30086304495232     
  1.723141959601116E-003  0.000000000000000E+000
  0.987142569360407       0.000000000000000E+000
  0.984383143975812       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
