         180           8
   11.3980447700270        10.7215603100005        10.1447415937407     
   9.41696905918287        8.72743917090135        8.08950519903620     
   7.41046890699299        6.73217440768204     
  -1.33206467049103       -2.98247986447311       -3.65123469078962     
  -3.90659740175104       -4.08130667345908       -4.23513771309619     
  -4.36697468250400       -4.63357956613118     
 -8.793641335872543E-003  0.000000000000000E+000
   1.00988603617990       0.000000000000000E+000
   1.01401571046588       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
