         180           8
   7.65304207522207        7.50592448837800        7.29982510294033     
   7.13796818448361        6.97882900075885        6.81791406881733     
   6.70063263035196        6.66163968937412     
  -5.83652856302371       -5.71183201697669       -5.59299353179213     
  -5.40743464309387       -5.21985970160819       -5.06345256255084     
  -4.90503600584079       -4.77708242852276     
 -8.603440294130980E-003  0.000000000000000E+000
   1.00958963621911       0.000000000000000E+000
   1.01370801395236       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
