         180           8
   5.23404876140415        5.04135807042153        4.87318776335067     
   4.75408213847124        4.64137252078702        4.53824367536780     
   4.45979266605965        4.33220564092462     
  -5.64446126830058       -5.45657088303741       -5.32213305474104     
  -5.16190370113528       -5.01190295566328       -4.87498880776218     
  -4.70726074275311       -4.54452710269643     
 -8.638913275808761E-003  0.000000000000000E+000
   1.00908998934712       0.000000000000000E+000
   1.01355234062498       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
