         180           8
   4.82644230725723        4.66903222559434        4.49869331532043     
   4.37267566867476        4.22903793856919        4.07451806027107     
   3.94687494390142        3.86232133779171     
  -6.90500631957163       -6.14146445435512       -5.99368512173456     
  -5.79091480694852       -5.60087401234495       -5.43102151854832     
  -5.20668048710715       -4.93849986241212     
 -8.819260135317655E-003  0.000000000000000E+000
   1.00980416071624       0.000000000000000E+000
   1.01370632903090       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
