         180           8
   6.28416443039263        6.09410453664675        5.95976178645073     
   5.81103068725533        5.67386118965092        5.56171766552250     
   5.48664429035699        5.38763553332451     
  -6.60765302661787       -6.50089836953227       -6.27676460952376     
  -6.05916673249514       -5.92600219328389       -5.76212989714218     
  -5.52731008433405       -5.25812334697787     
 -8.570756324107760E-003  0.000000000000000E+000
   1.00938296011895       0.000000000000000E+000
   1.01381542813582       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
