         180           3
   7.65921165831680        9.27602967102374        11.0663571609414     
  -4.98984380158914       -4.21609896433297       -3.33723404160706     
  1.596111885258337E-003  0.000000000000000E+000
  0.986819684075826       0.000000000000000E+000
  0.984042124780140       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
