         180           8
   14.1764998299107        13.9989702321292        13.8188594357785     
   13.5926665022507        13.4272387989379        13.3066067479349     
   13.0617190717726        13.0455332692267     
  -8.12914680113336       -7.91228681115293       -7.72545404821392     
  -7.56620342063831       -7.47428651806262       -7.28091534265212     
  -7.09708322771812       -7.07109072982270     
 -8.521895480734794E-003  0.000000000000000E+000
   1.01025688842014       0.000000000000000E+000
   1.01455754401884       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
