         180           3
   12.0274954731480        12.8739737579162        14.0170535253804     
  -8.35135112722261       -7.89819982051922       -7.33586238372409     
  2.526339857171206E-003  0.000000000000000E+000
  0.986985841018269       0.000000000000000E+000
  0.984245111059708       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
