         180           8
   6.73606683004544        6.44861881824697        6.26769212271677     
   6.13120525672418        5.99131415330467        5.87953994646950     
   5.79107863448306        5.69845600201168     
  -6.21738187197157       -6.19943438747825       -6.11783919401113     
  -5.83634581997771       -5.55579845148620       -5.32103618771014     
  -5.11600736164390       -4.90281870748972     
 -8.512189992636959E-003  0.000000000000000E+000
   1.00974068493910       0.000000000000000E+000
   1.01398118152009       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
