         180           8
   2.18708649059974        2.09518121460883        2.01836587963228     
   1.92164604368087        1.81201166329139        1.72413614457108     
   1.64037635522264        1.55832453819946     
  -5.15392060573597       -5.08532530560871       -4.90305485652346     
  -4.72011951649876       -4.53956032167001       -4.33881394423758     
  -4.13414187350249       -4.00721887376687     
 -8.760131454429713E-003  0.000000000000000E+000
   1.00956265373994       0.000000000000000E+000
   1.01392198271940       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
