         180           8
   1.60351976607226        1.48959953323827        1.39137228007541     
   1.27672651973862        1.14155515568719        1.00048487635260     
  0.883956503797789       0.784391652542967     
  -4.02140534056840       -3.96881902982896       -3.77790121497129     
  -3.53039849460710       -3.30912385771307       -3.14016168819358     
  -2.98534154811401       -2.88957912934562     
 -8.861658922764613E-003  0.000000000000000E+000
   1.00926778793859       0.000000000000000E+000
   1.01326735579109       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
